delete from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail';
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "TABLE_NAME", "TABLE_DESCRIBE", "TABLE_TYPE", "TABLE_CLASSIFY", "TABLE_ID_TYPE", "TABLE_SELECT", "IS_DB_SYNC", "IS_DES_FORM", "SUB_TABLE_MAPPING", "SUB_TABLE_SORT", "SUB_TABLE_TITLE", "THEME_TEMPLATE", "DESFORM_WEB_ID", "TREE_STYLE", "TREE_MODE", "TREE_LABEL_FIELD", "OPERATE_MENU_STYLE", "MAX_MENU_NUM", "FORM_STYLE", "SUB_TABLE_LIST_STR", "VIEW_DEFAULT_FIELD", "GROUP_DBFORM_ID", "ORDERBY_CONFIG", "WHERE_CONFIG", "DATA_CONFIG", "BASIC_FUNCTION", "BASIC_CONFIG", "TABLE_CONFIG", "DATA_SOURCES_CONFIG", "TABLE_STYLE", "IMPORT_DUPLICATE_TYPE") values(1963872477790674945, 1, 1, '2025-09-05 15:51:00', 100, 1, '2025-09-10 15:07:12', 0, 'lc_fire_operation_detail', '动火作业明细', 4, 1, 'NATIVE', 'multiple', 'Y', 'N', 'many', 1, '主要安全措施', 'normal', null, 'default', 'default', '', 'more', 1, 2, '', 'N', 1963432149124177923, '[{"order":"desc","column":"id"}]', null, 'page,initDataReq,authFalse', 'addBtn,editBtn,viewBtn,delBtn,batchDelBtn,importBtn,exportBtn', '', 'height,header,menu,index,border,rollBottom', '', '{"singleStyle":"default","singleCardSpan":"","expandShowNum":null,"expandMode":"","searchStyle":"default"}', 'update');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_ENHANCE_JAVA" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_ENHANCE_JS" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_ENHANCE_SQL" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978113, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'id', '主键', 128, 0, '', 'BigInt', '', 'Y', 'N', 1, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978114, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'sort', '项次', 128, 0, '0', 'Integer', '', 'N', 'Y', 2, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978115, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkContent', '检查项', 512, 0, '', 'String', '', 'N', 'Y', 3, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978116, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultId', '检查结果Id', 128, 0, '0', 'Integer', '', 'N', 'Y', 4, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978117, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultName', '检查结果', 128, 0, '', 'String', '', 'N', 'Y', 5, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978118, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'operationId', '作业ID', 128, 0, '', 'BigInt', '', 'N', 'Y', 6, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978119, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'confimUser', '确认人', 128, 0, '', 'String', '', 'N', 'Y', 7, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978120, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'tenant_id', '租户编号', 128, 0, '', 'BigInt', '', 'N', 'Y', 8, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978121, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_user', '创建人', 128, 0, '', 'BigInt', '', 'N', 'Y', 9, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978122, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_time', '创建时间', 128, 0, '', 'DateTime', '', 'N', 'Y', 10, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978123, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_dept', '创建部门id', 128, 0, '', 'BigInt', '', 'N', 'Y', 11, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978124, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_user', '更新人', 128, 0, '', 'BigInt', '', 'N', 'Y', 12, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978125, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_time', '更新时间', 128, 0, '', 'DateTime', '', 'N', 'Y', 13, 'Y');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "FIELD_NAME", "FIELD_LEN", "FIELD_POINT_LEN", "FIELD_DEFAULT_VAL", "FIELD_TYPE", "FIELD_REMARK", "IS_PRIMARY_KEY", "IS_NULL", "SORT_NUM", "IS_DB") values(1963872477861978126, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'is_deleted', '是否删除', 2, 0, '0', 'Integer', '', 'N', 'Y', 14, 'Y');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607874, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'id', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607875, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'sort', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607876, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkContent', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607877, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultId', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607878, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultName', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607879, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'tenant_id', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607880, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_user', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607881, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_time', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607882, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_dept', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607883, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_user', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607884, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_time', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607885, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'is_deleted', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607886, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'operationId', '', '', '', '', '', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_DICT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "DICT_TYPE", "DICT_CODE", "DICT_TABLE", "DICT_TEXT", "DICT_TABLE_COLUMN", "DICT_TEXT_FORMATTER", "DICT_TABLE_SEARCH") values(1963872478134607887, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'confimUser', '', '', '', '', '', '', '');


delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939522, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'id', 'N', 'N', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939523, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'sort', 'Y', 'Y', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939524, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkContent', 'Y', 'Y', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939525, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultId', 'Y', 'Y', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939526, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultName', 'Y', 'Y', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939527, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'tenant_id', 'N', 'N', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939528, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_user', 'N', 'N', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939529, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_time', 'N', 'N', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939530, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_dept', 'N', 'N', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939531, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_user', 'N', 'N', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939532, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_time', 'N', 'N', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939533, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'is_deleted', 'N', 'N', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939534, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'operationId', 'Y', 'Y', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_EXPORT"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_IMPORT", "IS_EXPORT", "IMPORT_EXAMPLE_TXT", "IS_IMPORT_DUPLICATE") values(1963872478184939535, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'confimUser', 'Y', 'Y', '', '');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939546, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'id', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939547, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'sort', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939548, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkContent', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939549, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultId', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939550, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultName', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939551, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'tenant_id', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939552, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_user', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939553, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_time', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939554, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_dept', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939555, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_user', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939556, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_time', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939557, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'is_deleted', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939558, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'operationId', 'lc_fire_operation', 'id');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_FOREIGNKEY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "MAIN_TABLE", "MAIN_FIELD") values(1963872478184939559, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'confimUser', '', '');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465498, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'id', 'Y', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465499, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'sort', 'N', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465500, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkContent', 'N', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465501, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultId', 'N', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465502, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultName', 'N', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465503, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'tenant_id', 'N', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465504, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_user', 'Y', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465505, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_time', 'Y', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465506, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_dept', 'Y', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465507, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_user', 'Y', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465508, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_time', 'Y', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465509, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'is_deleted', 'Y', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465510, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'operationId', 'Y', 'N', 'EQ', '', '');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_QUERY"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "QUERY_IS_DB", "QUERY_IS_WEB", "QUERY_MODE", "QUERY_CONFIG", "QUERY_DEFAULT_VAL") values(1963872478239465511, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'confimUser', 'N', 'N', 'EQ', '', '');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465473, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'id', 'Y', 'N', 'N', 'N', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''主键'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465474, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'sort', 'Y', 'Y', 'Y', 'Y', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''项次'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465475, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkContent', 'Y', 'Y', 'Y', 'Y', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''检查项'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465476, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultId', 'Y', 'Y', 'Y', 'Y', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''检查结果Id'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465477, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'checkResultName', 'Y', 'Y', 'Y', 'Y', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''检查结果'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465478, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'tenant_id', 'Y', 'N', 'N', 'N', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''租户编号'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465479, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_user', 'Y', 'N', 'N', 'N', 'N', 'N', 'userSelect', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''创建人'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465480, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_time', 'Y', 'N', 'N', 'N', 'N', 'N', 'date', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''创建时间'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465481, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'create_dept', 'Y', 'N', 'N', 'N', 'N', 'N', 'deptSelect', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''创建部门id'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465482, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_user', 'Y', 'N', 'N', 'N', 'N', 'N', 'userSelect', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''更新人'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465483, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'update_time', 'Y', 'N', 'N', 'N', 'N', 'N', 'date', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''更新时间'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465484, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'is_deleted', 'Y', 'N', 'N', 'N', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''是否删除'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465485, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'operationId', 'Y', 'Y', 'Y', 'Y', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''作业ID'',
  //English
  ''en'': '''',
}');
insert into "LOWCODE_FRAME"."LOWCODE_DBFORM_FIELD_WEB"("ID", "TENANT_ID", "CREATE_USER", "CREATE_TIME", "CREATE_DEPT", "UPDATE_USER", "UPDATE_TIME", "IS_DELETED", "DBFORM_ID", "FIELD_CODE", "IS_DB_SELECT", "IS_SHOW_LIST", "IS_SHOW_FORM", "IS_SHOW_COLUMN", "IS_SHOW_SORT", "IS_REQUIRED", "CONTROL_TYPE", "CONTROLS_CONFIG", "CELL_WIDTH", "CELL_WIDTH_TYPE", "VERIFY_CONFIG", "FORMAT_CONFIG", "LABEL_I18N") values(1963872478239465486, 1, 1, '2025-09-05 15:51:00', 100, null, '2025-09-10 15:07:07', 0, 1963872477790674945, 'confimUser', 'Y', 'Y', 'Y', 'Y', 'N', 'N', 'input', '', '', 'min', '', '{"formatType":"","formatJson":{"sql":{},"java":{},"fun":""}}', 'return {
  //简体中文
  ''zh-CN'': ''确认人'',
  //English
  ''en'': '''',
}');

delete from "LOWCODE_FRAME"."LOWCODE_DBFORM_BUTTON" where dbform_id in (select id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');

delete from "LOWCODE_FRAME"."LOWCODE_DESFORM" where id in (select desform_web_id from "LOWCODE_FRAME"."LOWCODE_DBFORM" where TABLE_NAME = 'lc_fire_operation_detail');
