update "LOWCODE_FRAME"."LOWCODE_DBFORM"
set IS_DB_SYNC='N'
where TABLE_NAME in ('lc_risk_hazard_manage', 'lc_confined_space_operation',
                     'lc_fire_operation', 'lc_high_operation', 'lc_land_operation',
                     'lc_lifting_operation', 'lc_outside_person',
                     'lc_risk_identify_assessment', 'lc_temporary_power_operation');