update "LOWCODE_FRAME"."LOWCODE_DBFORM" set IS_DB_SYNC='N' where TABLE_NAME in ('lc_lifting_operation','lc_lifting_operation_detail','lc_temporary_power_operation','lc_temporary_power_operation_detail'
,'lc_confined_space_operation','lc_confined_space_operation_safe','lc_confined_space_operation_check','lc_high_operation','lc_high_operation_detail','lc_outside_person','lc_land_operation','lc_fire_operation','lc_fire_operation_detail',
'lc_training_plan','lc_training_plan_area','lc_training_record','lc_emergency_plan','lc_drill_plan','lc_drill_plan_cycle','lc_drill_plan_issus','lc_drill_task','lc_exam_plan',
'lc_exam_plan_issus','lc_exam_record','lc_basic_safety_information');