update
        "LOWCODE_FRAME"."LOWCODE_DBFORM" 
    set
        IS_DB_SYNC='N' 
    where
        TABLE_NAME in (
            'lc_building','lc_power_env_device','lc_power_env_monitor_metric'
        );